+100

+200 +300

-100

-200

-300

shear velocity perturbation, m/s

-80˚

-75˚

-70˚

-65˚

-60˚

30˚

35˚

40˚

45˚

50˚

AM

GRENVILLE

PROVINCE

New England

Seamounts

-80˚

-75˚

-70˚

-65˚

-60˚

30˚

35˚

40˚

45˚

50˚

Bermuda

APPALACHIAN OROGEN

Continental Slope

N E A