0 25 50 75 100

range, km

-10-50

ln amplitude

A) P Wave

0 25 50 75 100

range, km

-10-50

ln amplitude

B) S Wave

15

2 0 f, Hz

0 25 50 75 100

range, km

-10-50

ln amplitude

C) S Model