0 51015202530354045505560-6-4-2 0 2 4 6 8distance [km] depth [km] detonation array of seismic stations

202530354045-6-4-2 0 2 4-2.0 2.03.06.5 velocity perturbation

[km/s] magma chamber ice cap distance [km]