Coaxial Magma Chamber On Segment bathymetric High Colocated with 1993 Source Site 2 km wide (cross axis) at least 3 km long (along axis)

but may be as much as 6-7 km (assuming 1993 dike marks northern end) At least 6 cubic kilometers in volume Containing at least 0.6 cubic km of melt (several 1993 eruptions) No mid-crust connection to Axial Magma Chamber Implies very focused transport of Axial "plume-derived" magmas through ridge system (10 km scale length)