"fast" ~100 Ma oceanic lithosphere

slow New England Anomaly

Kelvin Seamount OBS asthenosphere

100 km

LITHOSPHERE

ASTHENOSPHERE

LITHOSPHERE

ASTHENOSPHERE

altered lithosphere

LITHOSPHERE

ASTHENOSPHERE

altered asthenosphere

Figure 2. Schematic rendering of the New England Anomaly seismic structure, and possible scenarios that might expalin it.