DCD DPD

EC EFD

LMD

LS

O1

O2

O3

O4

PPB

PTA

SHD

VPD

Zerr < 1 km 1km < Zerr < 2km 2km < Zerr < 3km Zerr > 3km

120.96^° W 120.83^° W

35.12^° N

35.23^° N

5km