-1150 -900 -650 -400 -150 100 350 600 850 1100 1350

meters

280˚

280˚

281˚

281˚

282˚

282˚

283˚

283˚

284˚

284˚

285˚

285˚

286˚

286˚

287˚

287˚

288˚

288˚

289˚

289˚

290˚

290˚

38˚ 38˚

39˚ 39˚

40˚ 40˚

41˚ 41˚

42˚ 42˚

43˚ 43˚

44˚ 44˚

45˚ 45˚

46˚ 46˚

RARITAN

MAURICE R.

HUDSON-PK

ESOPUS CR

HUDSON-GI